〉_Tβ〈

0.25 0.3 0.35 0.4 0.45 0.5 0.55 0.6 0.65 0.7

(GeV) kinT

0.06

0.08 0.1 0.12

0.14

0.16

0.18 0.2

0-5%

80-90%

70-80%

0-5%

ALICE, Fit Range c < 1 GeV/ Tp : 0.5 < π c < 1.5 GeV/ Tp K: 0.2 < c < 3.0 GeV/ Tp p: 0.3 <

STAR, Fit Range c < 0.8 GeV/ Tp : 0.5 < π c < 0.75 GeV/ Tp K: 0.2 < c < 1.2 GeV/ Tp p: 0.35 < (a)